-- ----------------------------
-- Incremental migration for ops_order_security_ext
-- Version: v1.1.0 (2026-03-15)
-- Description: Add false_alarm column for false alarm marking
-- ----------------------------

ALTER TABLE `ops_order_security_ext`
    ADD COLUMN `false_alarm` tinyint(1) DEFAULT NULL COMMENT '是否误报: 1=误报'
    AFTER `result_img_urls`;
